Let $(s_n)$ be the sequence given by
$s_n=\frac{2^{1/n}+4^{-n}}{n^{1/n}+5n}$. 
Then $\lim s_n$ is
\correct 0
\wrong $\infty$
\wrong $1$
\wrong $1/5$
\wrong $2/5$

